p_miss_par (GeV)

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 0 20

40 60

80 100 120

140 3 10× Pmiss_par (0.8<W<1.1 GeV, Pmiss_perp < 0.1GeV) - Measured^{pmisspar_real_full_p} Entries 2871534 Mean 0.1037 RMS 0.2389

Pmiss_par (0.8<W<1.1 GeV, Pmiss_perp < 0.1GeV) - Measured

p_miss_par (GeV)

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 0

10000

20000

30000

40000

50000

Pmiss_par (0.8<W<1.1 GeV, Pmiss_perp < 0.1GeV) - Background pmisspar_back_full_p Entries 7631424 Mean 0.4607 RMS 0.3227

Pmiss_par (0.8<W<1.1 GeV, Pmiss_perp < 0.1GeV) - Background

p_miss_par (GeV)

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 -40 -20 0 20 40 60 80 100 120

3 10× Pmiss_par (0.8<W<1.1 GeV, Pmiss_perp < 0.1GeV) - Subtracted pmisspar_real_full_p Entries -4759890 Mean -0.1069 RMS 0.3004

Pmiss_par (0.8<W<1.1 GeV, Pmiss_perp < 0.1GeV) - Subtracted

p_miss_perp (GeV)

-0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8

Asymmetry

-0.2

-0.15

-0.1

-0.05

0

0.05

0.1 p_miss_perp Asymmetry