-0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

p_miss_par Uncharged to Charged Ratio

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16

0.02

0.04

0.06

0.08

0.1

0.12

p_miss_perp Uncharged to Charged Ratio

0.7 0.8 0.9 1 1.1 1.2 1.3

0.02

0.04

0.06

0.08

0.1

0.12

0.14

Invariant Mass Uncharged to Charged Ratio