htemp Entries 261108 Mean 83.6 RMS 118.6

na.nd.n1.rthit_time

-200 -100 0 100 200 300 0 5000

10000

15000

20000

25000

30000

35000

40000 na.nd.n1.rthit_time {abs(na.nd.n1.rthit_time)<2000.}

Analysis-level timing cuts

na.nd.v2.rthit_time {abs(na.nd.v2.rthit_time)<2000.}

Cuts need to be better matched b/t veto and nd ND from -100 to 200ns, veto from (DT+10ns) before to ~10ns after ND cut.

htemp Entries 960063 Mean -455.2 RMS 439.2

na.nd.v1.rthit_time

-1400 -1200 -1000 -800 -600 -400 -200 0 200 400 0 5000

10000

15000

20000

25000

30000

35000

40000 na.nd.v1.rthit_time {abs(na.nd.v1.rthit_time)<2000.}

Analysis-level timing cuts

na.nd.clus_tof

-50 0 50 100 150 200 250 300 na.nd.v1.hit_tof[clus_v1ind]

0

50

100

150

200

250

na.nd.v1.hit_tof[clus_v1ind]:na.nd.clus_tof {clus_fid>0&&clus_Prim>0&&clus_v1ind>=0}