p1b16tof

Entries 399 Mean -0.01662 RMS 1.211 / ndf

2χ 12.58 / 15 p0 0.611 ± 2.612 p1 4.36± 47.59 p2 0.030 ± -0.226 p3 0.0340 ± 0.4197

Time(ns)

-4 -2 0 2 4 0 10 20 30 40 50 60 ± ± ±

Plane 1 Bar 16 TOF