p1b21tof Entries 340 Mean -0.02429 RMS 1.087 / ndf

2χ 19.54 / 15 p0 0.431±

1.513 p1 4.43±

46.97 p2 0.0297 ± -0.2059 p3 0.0255 ± 0.3529

Time(ns)

-4 -2 0 2 4 0

10

20

30

40

50 ± ±

Plane 1 Bar 21 TOF