Figure 1: Neutron detector geometry used in Geant 4,

all sizes in cm_1

Figure 2: Protons with initial momentum 1.74 GeV/c

Figure 3: Neutrons with initial momentum 1.74 GeV/c

Figure 4: Protons with initial momentum 1.74 GeV/c

Figure 5: Neutrons with initial momentum 1.74 GeV/c

Figure 6: Protons with initial momentum 1.74 GeV/c

Figure 7: Neutrons with initial momentum 1.74 GeV/c

Figure 8: Protons with initial momentum 1.74 GeV/c

Figure 9: Neutrons with initial momentum 1.74 GeV/c

Figure 10: N pp - number of protons observed as protons,

N^n_p - number of protons observed as neutrons

Figure 11: N pn - number of neutrons observed as protons,

N^n_n - number of neutrons observed as neutrons

Figure 12: New neutron detector geometry for Geant 4