hct0

Entries 621 Mean 0.2898 RMS 1.619 / ndf

2χ 8.719 / 7 Constant 5.8± 95.2 Mean 0.02137 ± 0.07264 Sigma 0.0211 ± 0.4388

Pathlength-corr. ND-BB time diff, FIRST ND cluster (ns)

-20 -15 -10 -5 0 5 10 15 20 0

20

40

60

80

100 ± ±

Tdiff0 {elcut3&&NDcharged0&&PvMatch0&&PhMatch0&&na.nd.clus_xpos[0]>-1.8}