hct0

Entries 7996 Mean 0.2129 RMS 1.846 / ndf

2χ 18.1 / 7 Constant 19.5±

1202 Mean 0.00607 ± 0.04855 Sigma 0.0057 ± 0.4528

Pathlength-corr. ND-BB time diff, FIRST ND cluster (ns)

-20 -15 -10 -5 0 5 10 15 20 0

200

400

600

800

1000

1200 ± ±

Tdiff0 {elcut3&&NDcharged0&&PvMatch0&&PhMatch0&&na.nd.clus_xpos[0]>-1.8}