pminus Entries 1266940 Mean 1.296 RMS 0.3744

0.6 0.8 1 1.2 1.4 1.6 1.8 2

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

0.04

0.05

0.06

Pion Asymmetry v. Momentum