htemp Entries 174944 Mean 0.9808 RMS 3.591

clus_TOFdiff

-10 -5 0 5 10 0 2000

4000

6000

8000

10000

12000

14000

clus_TOFdiff {electron==1&&q_perp<.3&&abs(clus_TOFdiff)<10&&abs(W-0.925)<0.225}

Runs 4490-4494