htemp

Entries 8293 Mean 1.201 RMS 0.2261

sqrt(EK.W2)

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 0 100 200

300 400 500

600 W for Hydrogen, run #4427