W (GeV)

0.6 0.8 1 1.2 1.4 1.6 m_miss (GeV)

1

1.5

2

2.5

3

0

2000

4000

6000

8000

10000

12000

m_miss:W {electron==1&&q_perp<0.15&&abs(W-1.1)<0.5&&abs(m_miss-2)<1}