hr Entries 51222 Mean 0.2799 RMS 0.1363

(GeV) q 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 neutral/charged

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 Ratio of Uncharged to Charged