hc1p Entries 283 Mean 0.05832 RMS 1.017

Neutron X Pos(m)

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

5

10

15

20

25

This is Coin. in V1 for y>0 at Momentum interval of 0.05 around 1.10 with a X Position cut of 0.40