Event Rate(Hz)

0 2000 4000 6000 8000

Deadtime

0.0

0.2

0.4

0.6

0.8 -3 10×

Fractional Loss Narrow Fractional Loss Wide Pileup Narrow Pileup Wide DT Narrow DT Wide

Right HRS Group 4

Slope of linear fit:

1.19e-09 ± Wide: p1= 1.07e-07

9.36e-10 ± Narrow: p1= 7.11e-08