Event Rate(Hz)

0 100 200 300 310 ×

Deadtime

0.00

0.01

0.02

0.03

Left HRS Group 4

Slope of linear fit:

1.30e-09 ± Wide: p1= 1.02e-07

1.41e-09 ± Narrow: p1= 6.25e-08 Fractional Loss Narrow Fractional Loss Wide Pileup Narrow Pileup Wide DT Narrow DT Wide