Shower

500 1000 1500

Preshower

500

1000

1500 ps_sh2 Entries 395059 Mean x 353.6 Mean y 374.9 RMS x 283.5 RMS y 376.3

0 50 100 150 200 250 300 350 No TDC cut

Shower

500 1000 1500

Preshower

500

1000

1500 ps_sh2_cut Entries 30888 Mean x 646 Mean y 879.1 RMS x 178.8 RMS y 166.2

0 2 4 6 8 10 12 14 16 With TDC cut on electron wide triggers