Day 0 2 4 6 8 10 12 14 16 18 20

Efficiency

0.988

0.989

0.99

0.991

0.992

0.993

0.994

0.995

0.996

/ ndf

2χ 41.6 / 18 p0 0.0002429 ± 0.9914 ± Gas Cherenkov Efficiency (Left kine1)