Day 0 2 4 6 8 10 12 14

Efficiency

0.986

0.988

0.99

0.992

0.994

/ ndf

2χ 19.12 / 12 p0 0.0002566 ± 0.9903 ± Gas Cherenkov Efficiency (Left Kine2)