Day 2 4 6 8 10 12 14

Efficiency

0.932

0.934

0.936

0.938

0.94

0.942

0.944

0.946

0.948

0.95

0.952

0.954

/ ndf

2χ 13.57 / 10 p0 0.0005669 ± 0.945 ± Lead Glass Efficiency (Left Kine2)