Day 0 5 10 15 20 25 30

Efficiency

0.97

0.975

0.98

0.985

0.99

0.995

/ ndf

2χ 43.18 / 30 p0 0.000561 ± 0.9819 ± Gas Cherenkov Efficiency (Right kine2)