Day 0 5 10 15 20 25 30

Rejector

340 360 380 400 420 440 460 480 500 520 540 / ndf

2χ 8.078 / 29 p0 6.153 ± 414.3 ± Gas Cherenkov Pion Rej (Right kine2)