Day 0 5 10 15 20 25 30

Efficiency

0.93

0.935

0.94

0.945

0.95

0.955

/ ndf

2χ 149.3 / 30 p0 0.0003696 ± 0.9436 ± Lead Glass Efficiency (Right kine2)