Slug

2 4 6 8 10 12

asymmetry (ppm)

-150

-100

-50

0

50

100

150 HWP OUT, asym = 62.8 +/- 4.1(ppm)

HWP IN, asym = -61.4 +/- 3.9(ppm) left hrs

BLINDED