Slug

17 18 19 20 21 22 23 24 25

asymmetry (ppm)

-200

-150

-100 -50 0 50 100 150 200

HWP OUT, asym = 142.7 +/- 16.6(ppm)

HWP IN, asym = -116.0 +/- 14.6(ppm) left hrs

BLINDED