Slug

0 5 10 15 20 25

asymmetry (ppm)

-300

-200

-100

0

100

200

300 HWP OUT, asym = 132.5 +/- 9.7(ppm)

HWP IN, asym = -119.6 +/- 9.4(ppm) right hrs

BLINDED