Entries 3785156 Mean -116 RMS 2.838e+04 / ndf

2χ 9367 / 173 Constant 54±

8.483e+04 Mean 14.6±

-104.6 Sigma 10± 2.841e+04

-150 -100 -50 0 50 100 150 310 × 1

10

210

310

410

510 Left Arm Electron Global Asymmetry