CT Entries 228268 Mean 218.8 RMS 100.3

0 50 100 150 200 250 300 350 400 0 200 400 600 800 1000

1200

1400

1600

Coincidence Time (ns) EMC_Fit Entries 13546 Mean 11.32 RMS 8.064

-5 0 5 10 15 20

10

20

30

40

50 EMC_Fit

Emiss in Coincidence Peak (MeV)

green - in the coincidence peak

red - out of the coincidence peak

EMC_Sub

Entries -466 Mean 10.18 RMS 8.456

-5 0 5 10 15 20

0

10

20

30

40 emiss, Subtracted (MeV)