Y (mm)

-0.004 -0.002 0 0.002 0.004 0.006 0.008 0.01

Emiss (MeV)

0 5 10 15 20 25 30 35 40 45 50 EM_vs_Y Entries 64609 Mean x 0.001634 Mean y 21.61 RMS x 0.002648 RMS y 11.26

EMiss