0 50 100 150 200 250 300 350 400 450 500 0

2000

4000

6000

8000

10000

Coincidence Time (ns)

-20 -10 0 10 20 30 40 50 200 250 300 350 400 450 500 550 Emiss in Coincidence Peak (MeV) in Coinc. peak out Coinc. peak

-20 -10 0 10 20 30 40 50

0

50

100

150

200 emiss, Subtracted (MeV)

Subtracted sub. AND small accep.