0 50 100 150 200 250 300 350 400 450 500 0

200

400

600

800

1000

Coincidence Time (ns)

-20 -10 0 10 20 30 40 50

10

20

30

40

50 in Coinc. peak out Coinc. peak

Emiss in Coincidence Peak (MeV)

RUN 2 / Kin 10 -Pb thin- Runs (3355-3364) Good Events: in coinc peak ( subtracted ) Total (> 0 MeV): 5654 ( 3781 )

Pb (0 - 10 MeV): 125 ( -7 ) C as Pb (13 - 18 MeV): 87 ( -1 ) C as C (8 - 12 MeV): 57 ( -3 )^{-20 -10 0 10 20 30 40 50} -10

0

10

20

30

40 Subtracted

sub. AND small accep.

emiss, Subtracted (MeV)