Prec_ph*180/3.1415

-110 -105 -100 -95 -90 -85

Prec

160 180 200 220 240 260 280 300 320 340 360 380 Prec:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-110 -105 -100 -95 -90 -85

Ph_p_i*180/3.1415

58.5 59 59.5 60 60.5 61 61.5 62 62.5 63 Ph_p_i*180/3.1415:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-110 -105 -100 -95 -90 -85

Pf_p_i

730 740 750 760 770 780 790 800 810 Pf_p_i:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-110 -105 -100 -95 -90 -85

Ph_e_i*180/3.1415

-14.5 -14 -13.5 -13 -12.5 -12 -11.5 -11 -10.5

Ph_e_i*180/3.1415:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-110 -105 -100 -95 -90 -85

Pf_e_i

1900

1920

1940

1960

1980

Pf_e_i:Prec_ph*180/3.1415 {Numer_wt}