Prec_ph*180/3.1415

-115 -110 -105 -100 -95

Prec

260 280 300 320 340 360 380 400 420 440 460 480 Prec:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-115 -110 -105 -100 -95

Ph_p_i*180/3.1415

50 50.5 51 51.5 52 52.5 53 53.5 54 Ph_p_i*180/3.1415:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-115 -110 -105 -100 -95

Pf_p_i

900 910 920 930 940 950 960 970 980 990 Pf_p_i:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-115 -110 -105 -100 -95

Ph_e_i*180/3.1415

-15 -14.5 -14 -13.5 -13 -12.5 -12 -11.5 -11 Ph_e_i*180/3.1415:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-115 -110 -105 -100 -95

Pf_e_i

1720

1740

1760

1780

1800

1820

1840

1860

Pf_e_i:Prec_ph*180/3.1415 {Numer_wt}