Prec_ph*180/3.1415

-120 -115 -110 -105 -100 -95 -90 -85

Prec

150

200

250

300

350 Prec:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-120 -115 -110 -105 -100 -95 -90 -85

Ph_p_i*180/3.1415

52 52.5 53 53.5 54 54.5 55 55.5 56 Ph_p_i*180/3.1415:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-120 -115 -110 -105 -100 -95 -90 -85

Pf_p_i

930 940 950 960 970 980 990 1000

1010

1020

1030

Pf_p_i:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-120 -115 -110 -105 -100 -95 -90 -85

Ph_e_i*180/3.1415

-19 -18.5 -18 -17.5 -17 -16.5 -16 -15.5

Ph_e_i*180/3.1415:Prec_ph*180/3.1415 {Numer_wt}

Prec_ph*180/3.1415

-120 -115 -110 -105 -100 -95 -90 -85

Pf_e_i

1820

1840

1860

1880

1900

1920

1940

Pf_e_i:Prec_ph*180/3.1415 {Numer_wt}