Entries 73607 RMS 4.596 / ndf

2χ 1090 / 17 Constant 44.7±

7641 Mean 0.0061 ± 0.1033 Sigma 0.005 ± 1.368

LHRS-BigBite Coincidence time [ns]

-25 -20 -15 -10 -5 0 5 10 15 20 25 0 1000

2000

3000

4000

5000

6000

7000

8000^{Entries 73607}

± ± ± ±