Vertex (m)

-0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4 0 100 200 300 400 500 600 700 800

0.0 +- 0.1 mm

-0.0 +- 0.1 mm

-0.0 +- 0.1 mm

0.0 +- 0.1 mm-0.0 +- 0.1 mm

0.0 +- 0.1 mm

0.0 +- 0.1 mm

Vertex for multi-cabon run 3924