hDpKinAll0 Entries 7179

radiation corrected dp_kin (angular independant dp)

-0.046-0.044-0.042 -0.04 -0.038-0.036-0.034-0.032 -0.03 -0.028 1

10

210

310 -4 10 × -2.8 ± = -0.0 σ±Δ

Dp_Kin for Delta Scan Kine. #0 (All Data)^{hDpKinAll1}_{Entries 87251}

radiation corrected dp_kin (angular independant dp)

-0.032 -0.03 -0.028-0.026-0.024-0.022 -0.02 -0.018-0.016-0.014 1

10

210

310 hDpKinAll1 Entries 87251 -4 10 × 2.8 ± = -0.0 σ±Δ Dp_Kin for Delta Scan Kine. #1 (All Data)^{hDpKinAll2}_{Entries 92805}

radiation corrected dp_kin (angular independant dp)

-0.012 -0.01 -0.008-0.006-0.004-0.002 0 0.002 0.004 0.006 1

10

210

310 hDpKinAll2 Entries 92805 -4 10 × 2.8 ± = -0.1 σ±Δ Dp_Kin for Delta Scan Kine. #2 (All Data)

hDpKinAll3 Entries 135390

radiation corrected dp_kin (angular independant dp)

0.008 0.01 0.012 0.014 0.016 0.018 0.02 0.022 0.024 0.026 1

10

210

3 10 -4 10 × 3.4 ± = 0.0 σ±Δ Dp_Kin for Delta Scan Kine. #3 (All Data)^{hDpKinAll4}_{Entries 208125}

radiation corrected dp_kin (angular independant dp)

0.03 0.032 0.034 0.036 0.038 0.04 0.042 0.044 0.046 0.048 1

10

210

310 hDpKinAll4 Entries 208125 -4 10 × -3.6 ± = 0.0 σ±Δ Dp_Kin for Delta Scan Kine. #4 (All Data)