0

2

4

6

8

10

12

14

-0.06 -0.04 -0.02 0 0.02 0.04 0.06

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 ReactZ vs. Phi_rotate^{Vz2D}_{Entries 107313}

Mean x 0.007427 Mean y -0.03572 RMS x 0.02314 RMS y 0.1473 Integral 1.032e+05

Vertex #0

Vertex #1

Vertex #2

Vertex #3

Vertex #4

Vertex #5

Vertex #6

ReactZ vs. Phi_rotate