 EXP 89003 : June 10 - 30, 1997 Beam Energy 2445 MeV Page 1

RUN Target Start Stop I E Arm H Arm Pre Sca le Event Comments

              # /pos. A P % P % 1 3 5 /Rate

                                                     June 15 1997

    1463 H

                                                                            2

                                                                                 O

                                                             17505

0521 0622 11 1832 +4.5 23.41 5 928.9 +4.5 53.25 5 18 23 1 600k White Spectra Studies

    1464 ^ 0738 0827 11.7 1792 +2.5 ^ ^ 909.6 +2.5 ^ ^ 18 23 1 508k

    1465 ^ 15k Same as 1464

    1466 ^ 1045 1115 ~9.5 1753 ^ 890 10 15 1 276k

    1467 ^ 1148 1205 ~10 1753 ^ 890 ^ 10 15 1 270k

    1468 ^ 1209 1220 ~10 10 15 1 220k Same as 1467

    1472 ^ 1932 10 1715 -2.2 ^ ^ 870.4 -2.2 52.47 ^ 20 30 1 500k

    1473 ^ 2216 2255 10 1676 ^ ^ 850 ^ ^ 20 30 1 350k

    1474 ^ 2306 10.8 20 30 1 164k Same as 1473

                                                     June 16 1997

    1475 ^ 0029 0122 2.1 2074 23.36 ^ 997 ^ ^ 20 30 1 127.5k

    1476 ^ 0123 0133 2.1 ^ ^ ^ ^ ^ ^ 5 7 1 53k

    1477 ^ 0307 0350 2.9 2044 ^ ^ ^ ^ ^ 5 7 1 410.5k

    1478 ^ 0457 0540 ~1.5 2014 0 ^ ^ ^ 0 ^ ^ 5 7 1 414k

    1479 ^ 0543 0643 10.7 ^ ^ ^ 0.6 ^ ^ ^ ^ 5 140 1 323953

    1484 ^ 0839 0920 1.2 -1.5 ^ 5 ^ ^ ^ 2 2 1 622k

                                                     June 17 1997

    1487 ^ 0142 0159 ~1 1953 -3.0 ^ ^ ^ ^ ^ ^ 2 2 1 139.8k

    1489 ^ 0231 0255 ~1 1953 ^ ^ ^ ^ ^ ^ ^ 2 2 1 215k

    1490 ^ 0319 0350 1.3 1953 ^ ^ ^ ^ ^ ^ ^ 2 2 1 300k ypos »  0.7

                                                     June 18 1997

    1495 ^ 0348 0432 2 1953 +3.0 ^ ^ ^ ^ ^ ^ 2 2 1 562k

    1496 ^ 0611 0652 2.2 2014 0 ^ ^ 1027 +3.0 ^ ^ 2 2 1 620k

    1497 ^ 0728 0810 2 ^ ^ ^ +1.5 ^ ^ 2 2 1 620k

    1499 ^ 1340 ^ -3.0 2 2 1 18k watch beam pos. in replay

    1500 ^ 1342 <2.5 ^ ^ ^ ^ 2 2 1 110k may be junk, watch beam

    1501 ^ 1352 1432 1.0 ^ ^ ^ ^ 2 2 1 495k ypos fluctuating

    1502 ^ 1434 1445 1.1 ^ ^ ^ ^ 2 2 1 110k ypos fluctuating

    1503 ^ 2210 2220 19 2445 S.S 973 ^ 20 800 1 8400 Q3(E-arm) wrong setting

    1504 ^ 2221 2303 20.0 ^ ^ ^ ^ ^ ^ 20 800 1 25538

    1505 ^ 2308 2346 18 ^ ^ 5 0 ^ ^ 100 800 1

    1506 ^ 2347 0055 19 ^ ^ ^ ^ 100 800 1 370k Beam pos unstable

                                                     June 19 1997

    1507 ^ 0103 0156 19 ^ ^ ^ ^ 100 800 1 370k

    1508 ^ 0243 0400 8.6 ^ ^ ^ ^ 100 800 1 284k

A. Saha, O16-RUN7.DOC (July, 1997)