EXP 89003: 16O( e,e´p)  RUN SUMMARY

                      Time Period Energy Page RUN Run #s Data

May  19-23, 1997 845  MeV Page 1 RUN1 1152-1206 calibrations

June   1-6, 1997 845   MeV Page 1 RUN2 1245-1288 calibrations

Page 2 RUN3 1289-1327
calibrations,   pq = 0

°
, +8

°
, +16

°

Page 3 RUN4 1328-1336
pq = +16

°

June   6-10, 1997 1645   MeV Page 1 RUN5 1342-1383
calibrations,   pq = 0

°

Page 2 RUN6 1384-1425
pq = +8

°
, -8

°
,   High e

m

 study

June  10-30, 1997 2445   MeV Page 1 RUN7 1463-1508 calibrations

Page 2 RUN8 1532-1578
calibrations,   pq = 0

°
, -16

°

Page 3 RUN9 1579-1629
pq = -16

°
, -8

°
, +8

°
, +16

°

Page 4 RUN10 1631-1670
pq = +16

°

Page 5 RUN11 1672-1711
pq = +20

°
,   calibrations

Page 6 RUN12 1712-1740
pq = +20

°
, -20

°

August 17-20, 1997 845 MeV Page 1 RUN13 5035-5078
calibrations,   pq = 0

°
, +16

°

Page 2 RUN14 5079-5086
pq = +16

°

A. Saha, O16-RUN-SUMMARY.DOC (Sept, 1997)