EXP 89-044 : Spectrometer Set-ups

February 02, 2000 Part 1^3He(e,e’p)d Perpendicular Kinematics

Run Kin E_0 E_e `_e P_p `_p t # (GeV) (GeV) (deg) (GeV/c) (deg) (hr) 1-2 Σ_1 4.803 3.966 16.40 1.480 48.30 0.7 3 Σ_3 1.254 0.417 118.72 1.480 14.13 1.3 4 Σ_1 4.803 3.966 16.40 1.473 54.04 0.9 5 Σ_2 4.803 3.966 16.40 1.473 42.65 0.7 6 Σ_3 1.254 0.417 118.72 1.473 19.87 3.4 7 Σ_1 4.803 3.966 16.40 1.438 59.83 10.1 8 Σ_2 4.803 3.966 16.40 1.438 36.76 6.6 9 Σ_3 1.254 0.417 118.72 1.438 25.67 33.3 10 Σ_1 4.803 3.966 16.40 1.410 64.76 19.9 11 Σ_2 4.803 3.966 16.40 1.410 31.84 15.5 12 Σ_3 1.254 0.417 118.72 1.410 30.59 64.6 13 Σ_1 4.803 3.966 16.40 1.373 69.80 35.2 14 Σ_2 4.803 3.966 16.40 1.373 26.79 42.8 15 Σ_3 1.254 0.417 118.72 1.373 35.63 122.0

Part 2^3He(e,e’p)d Parallel Kinematics

Run Kin E_0 E_e `_e P_p `_p t # (GeV) (GeV) (deg) (GeV/c) (deg) (hr) 16 Σ_1 4.045 3.607 13.51 1.000 57.43 0.4 17 Σ_3 0.845 0.407 100.12 1.000 23.52 0.6 18 Σ_1 4.803 3.581 20.93 1.915 41.25 1.0 19 Σ_3 1.953 0.731 78.18 1.915 21.64 1.0 20 Σ_1 4.803 2.593 33.34 2.999 28.42 2.6 21 Σ_3 2.903 0.694 91.19 2.999 13.37 2.4 22 Σ_1 2.903 2.203 16.46 1.295 38.30 12.4 23 Σ_3 1.254 0.554 51.48 1.295 25.50 7.6 24 Σ_1 4.803 3.283 17.47 2.229 30.53 14.4 25 Σ_3 1.953 0.433 81.90 2.229 12.78 25.6 26 Σ_1 4.045 3.783 14.17 0.680 67.86 27.0 27 Σ_3 0.845 0.583 86.84 0.680 35.62 23.0

JM/tab14 He3 02-02-00.tex 02-Feb-2000