Energy (MeV)

2000 2500 3000 3500 4000 4500

Asymmetry Difference

-4000

-2000

0

2000

4000

6000

8000

In - OUT, Asymmetry Difference (w/ 270)

/ ndf

2χ 7.084 / 8 p0 293.8 ± -225.3 p1 0± 0 ±