Energy Loss (MeV)

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18 0.2

Counts

0

500

1000

1500

2000

2500 310 × Continuous Loss and Delta Ray Landau Distribution

C Thickness 0.1mm) 12 Ionization Energy Loss Distribution (