momentum (GeV/c)

0.5 1 1.5 2 2.5 3

Etot/p

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18

RHRS PreShower/Shower Calibration Stability Check

0

2253 MeV 1706 MeV 1157 MeV 2253 (2) MeV 3351 MeV