momentum (GeV/c)

0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2

Etot/p0

0.85

0.9

0.95

1

1.05

1.1

1.15

LHRS Pion Rejector Stability Check for 2.2 GeV