Ls1la_p0 Entries 84209 Mean 23.08 RMS 34.01

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410

Left arm S1 L-PMT ADCs (PedSub) 0^{Ls1ra_p0}_{Entries 86708}

Mean 138.1 RMS 137.3

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410 Ls1ra_p0 Entries 86708

Left arm S1 R-PMT ADCs (PedSub) 0

Ls1la_p1 Entries 96244 Mean 42.66 RMS 48.73

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410

Left arm S1 L-PMT ADCs (PedSub) 1^{Ls1ra_p1}_{Entries 98933}

Mean 129.4 RMS 127.1

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410 Ls1ra_p1 Entries 98933

Left arm S1 R-PMT ADCs (PedSub) 1

Ls1la_p2 Entries 204995 Mean 147.5 RMS 119.3

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410 Left arm S1 L-PMT ADCs (PedSub) 2^{Ls1ra_p2}_{Entries 205795}

Mean 163.2 RMS 126.5

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410

Ls1ra_p2 Entries 205795

Left arm S1 R-PMT ADCs (PedSub) 2

Ls1la_p3 Entries 227851 Mean 98.76 RMS 82.16

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410

Left arm S1 L-PMT ADCs (PedSub) 3^{Ls1ra_p3}_{Entries 352700}

Mean 81.75 RMS 95.12

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410

510 Ls1ra_p3 Entries 352700

Left arm S1 R-PMT ADCs (PedSub) 3

Ls1la_p4 Entries 253828 Mean 348.3 RMS 216.9

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410 Left arm S1 L-PMT ADCs (PedSub) 4^{Ls1ra_p4}_{Entries 259108}

Mean 233.4 RMS 143.5

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410

Ls1ra_p4 Entries 259108

Left arm S1 R-PMT ADCs (PedSub) 4

Ls1la_p5 Entries 277372 Mean 189.5 RMS 125.1

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

410 Left arm S1 L-PMT ADCs (PedSub) 5^{Ls1ra_p5}_{Entries 279879}

Mean 844.5 RMS 458.5

0 500 1000 1500 2000 2500 3000 3500 4000 1

10

210

310

Ls1ra_p5 Entries 279879

Left arm S1 R-PMT ADCs (PedSub) 5