Ls2la_p12 Entries 781 Mean 22.6 RMS 37.98

-100 0 100 200 300 400 500 1

10

210

Left arm S2 L-PMT ADCs (PedSub) 12 Ls2ra_p12

Entries 1047744 Mean 24.4 RMS 1.119

-100 0 100 200 300 400 500

3 10

410

5 10

6 10 Ls2ra_p12

Left arm S2 R-PMT ADCs (PedSub) 12

Ls2la_p13 Entries 18697 Mean 18.3 RMS 20.09

-100 0 100 200 300 400 500 1

10

210

3 10

410 Left arm S2 L-PMT ADCs (PedSub) 13 Ls2ra_p13

Entries 1047744 Mean 20.51 RMS 1.03

-100 0 100 200 300 400 500 210

3 10

410

5 10

6 10 Ls2ra_p13

Left arm S2 R-PMT ADCs (PedSub) 13

Ls2la_p14 Entries 20978 Mean 19.52 RMS 19.72

-100 0 100 200 300 400 500 1

10

210

3 10

410 Left arm S2 L-PMT ADCs (PedSub) 14 Ls2ra_p14

Entries 1047744 Mean 20.32 RMS 1.053

-100 0 100 200 300 400 500 10

210

3 10

410

5 10

6 10 Ls2ra_p14

Left arm S2 R-PMT ADCs (PedSub) 14

Ls2la_p15 Entries 14690 Mean 19.27 RMS 21.54

-100 0 100 200 300 400 500 1

10

210

3 10

410 Left arm S2 L-PMT ADCs (PedSub) 15 Ls2ra_p15

Entries 1047744 Mean 22.98 RMS 1.222

-100 0 100 200 300 400 500 3 10

410

5 10

6 10

Ls2ra_p15

Left arm S2 R-PMT ADCs (PedSub) 15