urbx

-3 -2.5 -2 -1.5 -1 0 100 200 300 400 500 600 700 800 urbx {abs(urbx)<5}^{htemp}_{Entries 40000}

Mean -2.054 RMS 0.4993

urbx {abs(urbx)<5}

rawcury

3600 3800 4000 4200 4400 3 10× 0 100 200 300 400 500 600 700 800 rawcury htemp_{Entries 40000}

Mean 4.049e+06 RMS 2.14e+05

rawcury

-1.2+(rawcury-4020e3)/400e3

-2 -1.5 -1 -0.5 0

L.tr.tg_y

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0 100 200 300 400 500 600

L.tr.tg_y:-1.2+(rawcury-4020e3)/400e3 {abs(L.tr.tg_y)<0.3}

Run 2297

+1mm