Entries 202061 Mean 182.3 RMS 72.24

50 100 150 200 250 300 350 400 0

200

400

600

800

1000

L-arm VDC u1 wires Entries 201342 Mean 185.5 RMS 78.39

50 100 150 200 250 300 350 400 0 100 200 300 400 500 600 700 800 900 Entries 201342

L-arm VDC u2 wires Entries 202140 Mean 180.2 RMS 72.79

50 100 150 200 250 300 350 400 0 100 200 300 400 500 600 700 800 900 Entries 202140

L-arm VDC v1 wires Entries 201005 Mean 183 RMS 78.73

50 100 150 200 250 300 350 400 0 100

200 300 400 500 600 700 800 900 Entries 201005

L-arm VDC v2 wires

Entries 202061 Mean 1494 RMS 215.4

500 1000 1500 2000 2500 0

1000

2000

3000

4000

5000

L-arm VDC u1 time Entries 201342

Mean 1486 RMS 215.3

500 1000 1500 2000 2500 0

1000

2000

3000

4000

5000

Entries 201342

L-arm VDC u2 time Entries 202140

Mean 1509 RMS 218.9

500 1000 1500 2000 2500 0

1000

2000

3000

4000

5000

Entries 202140

L-arm VDC v1 time Entries 201005

Mean 1501 RMS 215.1

500 1000 1500 2000 2500 0

1000

2000

3000

4000

5000

Entries 201005

L-arm VDC v2 time

Entries 40000 Mean 5.048 RMS 2.602

0 5 10 15 20 25 30 35 40 45 0 2000

4000

6000

8000

10000

12000

14000

16000

18000 Entries 40000

Num Hits Left U1 Entries 40000

Mean 5.031 RMS 2.617

0 5 10 15 20 25 30 35 40 45 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Entries 40000

Num Hits Left U2 Entries 40000

Mean 5.051 RMS 2.652

0 5 10 15 20 25 30 35 40 45 0 2000

4000

6000

8000

10000

12000

14000

16000

18000 Entries 40000

Num Hits Left V1 Entries 40000

Mean 5.022 RMS 2.616

0 5 10 15 20 25 30 35 40 45 0 2000

4000

6000

8000

10000

12000

14000

16000

18000 Entries 40000

Num Hits Left V2

Entries 345 Mean 173.3 RMS 100.1

0 50 100 150 200 250 300 350 400

0.75

0.80

0.85

0.90

0.95

1.00

1.05

1.10

Left arm U1 efficiency Entries 359 Mean 180 RMS 103.8

0 50 100 150 200 250 300 350 400

0.75

0.80

0.85

0.90

0.95

1.00

1.05

1.10

Entries 359

Left arm U2 efficiency Entries 349 Mean 176.3 RMS 100.8

0 50 100 150 200 250 300 350 400

0.75

0.80

0.85

0.90

0.95

1.00

1.05

1.10

Entries 349

Left arm V1 efficiency Entries 360 Mean 180.6 RMS 103.9

0 50 100 150 200 250 300 350 400

0.75

0.80

0.85

0.90

0.95

1.00

1.05

1.10

Entries 360

Left arm V2 efficiency