500 1000 1500 2000 2500 3000 3500 4000

500

1000

1500

2000

2500

3000

3500

4000

Entries 40000 Mean x 96.19 Mean y 64.24 RMS x 59.96 RMS y 29.87

Pion Rejector_1 sum vs. PR_2 sum